Uninstalling CyberLinks
CyberLinks Setup

Uninstalling CyberLinks

If you wish to remove CyberLinks from your machine, you must use one of the following methods to "uninstall" it.  Simply removing the CyberLinks install directory will not remove all the components installed during the CyberLinks setup process.

Under Windows 95, choose “Start : Settings : Control Panel : Add/Remove Programs”.  Within this dialog box, choose "CyberLinks" and choose the "Add/Remove ..." button.

Under Windows NT, double-click the "Uninstaller" icon in the CyberLinks group within Program Manager.

Beta Note:  Some registry entries don’t get cleaned up correctly yet.  This will be fixed in a subsequent release.  The instructions for Uninstalling may change as well.


Understanding CyberLinks Install Results
CyberLinks Setup

Understanding CyberLinks Install Results

There are no visible applications installed with CyberLinks.  This is because, CyberLinks is designed as a set of OLE objects that work seamlessly within your working environment.

Please take note of the special documents:

TECHSUP.DOC	Information on receiving support for CyberLinks

README.TXT	Updated information regarding CyberLinks

A number of sample documents and applications have been created under this folder structure in your CyberLinks directory

SAMPLES

EXCEL	MS-Excel sample spreadsheets

POWERPOINT	MS-Powerpoint sample presentations

WORD	MS-Word sample documents

VB	Visual Basic 4.0 sample forms and applications


How to automate installation of CyberLinks on many machines
CyberLinks Setup

How to automate installation of CyberLinks on many machines

CyberLinks supports a silent setup option.  This automates installation on workstations without any user interference.

One way in which this could be used in a corporate network setting is to copy the CyberLinks disks into a directory on a file server, say CYBERLNK (within subdirectories called DISK1 and DISK2).

Then, include a command in users’ network login script to launch the CyberLinks SETUP from the DISK1 directory, using the following command:

setup /s

On Windows 95, automated setup will install CyberLinks in "C:\Program Files\CyberLinks".

On Windows NT, automated setup will install CyberLinks in "C:\CyberLinks".


How to install CyberLinks on a single machine
CyberLinks Setup

How to install CyberLinks on a single machine

Insert the CyberLinks "Disk 1" in the drive, and run SETUP from it.

Follow the instructions that appear on the screen to complete setup.


Contents
CyberLinks Setup

CyberLinks has been designed so that it is extremely easy to install whether it is on a single desktop or on multiple machines connected to a LAN file server.  Click on the following links for quick instructions on installing CyberLinks.

Installing CyberLinks on a single machine

Automating installation of CyberLinks on many machines

Understanding CyberLinks Install Results

Uninstalling CyberLinks